<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.44


######### Lightcurve features #########

amplitude  =  0.273908665392
cusum  =  0.165511567284
eta  =  0.427769120235
hl_amp_ratio  =  0.650230877213
kurtosis  =  -1.00445634625
n_points  =  305
period  =  0.538300055516
period_SNR  =  35.5473010483
period_log10FAP  =  -37.705794223
period_uncertainty  =  8.03384972577e-05
phase_cusum  =  0.26355335704
phase_eta  =  0.604870401904
phi21  =  1.04982836104
phi31  =  2.82503013712
quartile31  =  0.41
r21  =  0.257725643617
r31  =  0.110243308465
shapiro_w  =  0.925816476345
skewness  =  -0.452121637119
slope_per10  =  -0.108881213557
slope_per90  =  0.191451110297
stetson_k  =  0.854889809304
weighted_mean  =  14.6817285839
weighted_std  =  0.239712926951
</pre></body></html>