-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.282092619514
cusum  =  0.126163073225
eta  =  0.601838228905
hl_amp_ratio  =  0.943728808039
kurtosis  =  -1.00304708223
n_points  =  332
period  =  0.693943703879
period_SNR  =  36.9568733131
period_log10FAP  =  -38.8716288384
period_uncertainty  =  0.000136786196042
phase_cusum  =  0.276042136087
phase_eta  =  0.374862025664
phi21  =  -1.99436211566
phi31  =  -3.8796845996
quartile31  =  0.4325
r21  =  0.441116045279
r31  =  0.285237012019
shapiro_w  =  0.961472272873
skewness  =  -0.175578185845
slope_per10  =  -0.103028662753
slope_per90  =  0.379600001033
stetson_k  =  0.843276093169
weighted_mean  =  14.5265567856
weighted_std  =  0.263444831273
