-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.338040620552
cusum  =  0.206917573428
eta  =  0.468292796176
hl_amp_ratio  =  0.45017967108
kurtosis  =  -0.419994156568
n_points  =  310
period  =  0.607411765884
period_SNR  =  39.2171807257
period_log10FAP  =  -41.5214759674
period_uncertainty  =  0.000101350160535
phase_cusum  =  0.258789234602
phase_eta  =  0.122586313426
phi21  =  3.86027890535
phi31  =  2.06156696852
quartile31  =  0.3975
r21  =  0.460203668616
r31  =  0.280009812327
shapiro_w  =  0.899023890495
skewness  =  -0.825684890746
slope_per10  =  -0.147321197136
slope_per90  =  0.317500007804
stetson_k  =  0.753462589254
weighted_mean  =  14.1788801997
weighted_std  =  0.283144326169
