-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.144702949944
cusum  =  0.115433811615
eta  =  0.763485032937
hl_amp_ratio  =  1.02268835683
kurtosis  =  -0.831441345778
n_points  =  293
period  =  0.625447875479
period_SNR  =  46.9988245642
period_log10FAP  =  -38.6804963968
period_uncertainty  =  0.000110871427063
phase_cusum  =  0.237177840552
phase_eta  =  0.289663400993
phi21  =  -2.13293659538
phi31  =  -0.810485882756
quartile31  =  0.21
r21  =  0.469646525807
r31  =  0.289097090721
shapiro_w  =  0.965433895588
skewness  =  -0.287682870294
slope_per10  =  -0.192843532407
slope_per90  =  0.24191323701
stetson_k  =  0.840498348225
weighted_mean  =  14.5936028814
weighted_std  =  0.1222074888
