-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.329684430766
cusum  =  0.107319962097
eta  =  0.637270770895
hl_amp_ratio  =  0.47554742358
kurtosis  =  -0.419588011096
n_points  =  357
period  =  0.600772986676
period_SNR  =  38.4347011476
period_log10FAP  =  -41.5745836662
period_uncertainty  =  0.000100055459775
phase_cusum  =  0.284236362641
phase_eta  =  0.521450074495
phi21  =  4.0018055814
phi31  =  5.26437552852
quartile31  =  0.46
r21  =  0.391182666461
r31  =  0.17442526119
shapiro_w  =  0.929085195065
skewness  =  -0.664913367368
slope_per10  =  -0.0729899028508
slope_per90  =  0.26627539648
stetson_k  =  0.778417913397
weighted_mean  =  14.8922679286
weighted_std  =  0.287297622416
