-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.306573308628
cusum  =  0.120790696608
eta  =  0.491663340229
hl_amp_ratio  =  0.466501041479
kurtosis  =  0.323985417088
n_points  =  432
period  =  0.600974635987
period_SNR  =  42.0873464424
period_log10FAP  =  -43.5650934028
period_uncertainty  =  0.000102123207696
phase_cusum  =  0.227078093458
phase_eta  =  0.439409283787
phi21  =  -2.14884284132
phi31  =  -4.13509495505
quartile31  =  0.29
r21  =  0.549217012093
r31  =  0.290223997711
shapiro_w  =  0.924507141113
skewness  =  -0.921645545667
slope_per10  =  -0.114279803993
slope_per90  =  0.236828457122
stetson_k  =  0.709973588613
weighted_mean  =  14.4986568832
weighted_std  =  0.247043670884
