-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.192903580118
cusum  =  0.152849213357
eta  =  0.446115780066
hl_amp_ratio  =  0.818248744088
kurtosis  =  -1.24995551354
n_points  =  312
period  =  0.610306371387
period_SNR  =  42.2439774639
period_log10FAP  =  -45.9026227679
period_uncertainty  =  0.000105765005716
phase_cusum  =  0.283735960768
phase_eta  =  0.0484178181863
phi21  =  1.0840197547
phi31  =  2.5207508398
quartile31  =  0.2625
r21  =  0.463491261286
r31  =  0.280082342835
shapiro_w  =  0.943963170052
skewness  =  -0.170821066861
slope_per10  =  -0.282992773554
slope_per90  =  0.511228768453
stetson_k  =  0.889166234377
weighted_mean  =  14.0081483495
weighted_std  =  0.152196770095
