-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.3


######### Lightcurve features #########

amplitude  =  2.57774670308
cusum  =  0.417554307835
eta  =  0.185594772467
hl_amp_ratio  =  0.838569806231
kurtosis  =  -1.43247848923
n_points  =  109
period  =  0.997421459
period_SNR  =  19.4556315282
period_log10FAP  =  -11.2748664928
period_uncertainty  =  0.000275165948986
phase_cusum  =  0.290665271786
phase_eta  =  0.468658660993
phi21  =  2.57582781291
phi31  =  5.73487269821
quartile31  =  4.6
r21  =  0.0265284585781
r31  =  0.149301569178
shapiro_w  =  0.864604771137
skewness  =  -0.201211027333
slope_per10  =  -0.154253011432
slope_per90  =  0.140093087619
stetson_k  =  0.847610973351
weighted_mean  =  11.1825688073
weighted_std  =  2.01023683103
