-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.274515743952
cusum  =  0.229386262216
eta  =  0.449742497205
hl_amp_ratio  =  0.21901825912
kurtosis  =  -0.687664682404
n_points  =  135
period  =  0.64448038666
period_SNR  =  22.0814764345
period_log10FAP  =  -15.6105424769
period_uncertainty  =  0.000207695923107
phase_cusum  =  0.312680100968
phase_eta  =  0.315283067246
phi21  =  -2.4298680894
phi31  =  -4.1736433231
quartile31  =  0.33
r21  =  0.331029535558
r31  =  0.210927867776
shapiro_w  =  0.871764779091
skewness  =  -0.803078550391
slope_per10  =  -0.17977617031
slope_per90  =  0.454858993214
stetson_k  =  0.680330991103
weighted_mean  =  15.4104296346
weighted_std  =  0.215004920455
