-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.329654440787
cusum  =  0.137032505151
eta  =  0.608932069588
hl_amp_ratio  =  0.707407082517
kurtosis  =  -0.767013878818
n_points  =  164
period  =  0.609060901853
period_SNR  =  21.765795358
period_log10FAP  =  -18.9028191844
period_uncertainty  =  0.000125407191697
phase_cusum  =  0.272444976609
phase_eta  =  0.091007676314
phi21  =  -2.16163521074
phi31  =  -4.07353257356
quartile31  =  0.4325
r21  =  0.512544697774
r31  =  0.283346363315
shapiro_w  =  0.94143217802
skewness  =  -0.505220212629
slope_per10  =  -0.149871796096
slope_per90  =  0.33000000054
stetson_k  =  0.81863742689
weighted_mean  =  12.7189795918
weighted_std  =  0.289585875304
