-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.179824942324
cusum  =  0.196760432808
eta  =  0.539174700034
hl_amp_ratio  =  0.690914099582
kurtosis  =  -1.05654833071
n_points  =  134
period  =  0.8236980871
period_SNR  =  23.5619381285
period_log10FAP  =  -18.3104929119
period_uncertainty  =  0.000296843458771
phase_cusum  =  0.3290658467
phase_eta  =  0.175607420681
phi21  =  1.31381941426
phi31  =  3.27987569291
quartile31  =  0.2675
r21  =  0.462205922598
r31  =  0.187372028882
shapiro_w  =  0.950133681297
skewness  =  -0.0528650008154
slope_per10  =  -0.340938274066
slope_per90  =  0.563234569488
stetson_k  =  0.818293924938
weighted_mean  =  15.180858256
weighted_std  =  0.156426693302
