-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.365725569507
cusum  =  0.116925684085
eta  =  0.979656020812
hl_amp_ratio  =  0.63397794828
kurtosis  =  -0.843724797522
n_points  =  165
period  =  0.579710496341
period_SNR  =  29.6748207371
period_log10FAP  =  -21.6600283402
period_uncertainty  =  0.000147028033698
phase_cusum  =  0.25412319986
phase_eta  =  0.184511460225
phi21  =  -2.47348980708
phi31  =  -1.07395009998
quartile31  =  0.51
r21  =  0.424342668535
r31  =  0.362030416207
shapiro_w  =  0.932417213917
skewness  =  -0.491389562236
slope_per10  =  -0.142129865199
slope_per90  =  0.331771993583
stetson_k  =  0.830476867716
weighted_mean  =  15.2451888858
weighted_std  =  0.305593982165
