<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.286713671443
cusum  =  0.21788383455
eta  =  0.572422348755
hl_amp_ratio  =  0.81250543055
kurtosis  =  -0.426915521235
n_points  =  325
period  =  0.679991836468
period_SNR  =  39.3145124949
period_log10FAP  =  -37.2756586756
period_uncertainty  =  0.000104413336277
phase_cusum  =  0.272403395233
phase_eta  =  0.519094388728
phi21  =  1.03436216017
phi31  =  4.26064576784
quartile31  =  0.38
r21  =  0.346879790017
r31  =  0.210975802883
shapiro_w  =  0.983999848366
skewness  =  -0.21117413816
slope_per10  =  -0.0926908002289
slope_per90  =  0.125103954876
stetson_k  =  0.775206611507
weighted_mean  =  15.6190988406
weighted_std  =  0.267795446405
</pre></body></html>