-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.264769934214
cusum  =  0.118590859612
eta  =  0.597470042076
hl_amp_ratio  =  0.470316531082
kurtosis  =  -0.882704199888
n_points  =  291
period  =  0.557291793625
period_SNR  =  37.5303732831
period_log10FAP  =  -38.715744641
period_uncertainty  =  0.000100358691104
phase_cusum  =  0.269724637133
phase_eta  =  0.247392495731
phi21  =  0.99678309651
phi31  =  -0.78163017716
quartile31  =  0.365
r21  =  0.408380252979
r31  =  0.21779456206
shapiro_w  =  0.938402533531
skewness  =  -0.5074203185
slope_per10  =  -0.131310739896
slope_per90  =  0.113931083482
stetson_k  =  0.777603285346
weighted_mean  =  15.9908868642
weighted_std  =  0.245084668154
