<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.289770431981
cusum  =  0.105470557804
eta  =  0.782059774596
hl_amp_ratio  =  0.617751786894
kurtosis  =  -0.465060195602
n_points  =  328
period  =  0.554560354083
period_SNR  =  37.3794455872
period_log10FAP  =  -34.092273524
period_uncertainty  =  8.73433451915e-05
phase_cusum  =  0.279638637013
phase_eta  =  0.528544255344
phi21  =  -2.0549252174
phi31  =  -0.952649657779
quartile31  =  0.4025
r21  =  0.47629131396
r31  =  0.294823174976
shapiro_w  =  0.970982015133
skewness  =  -0.438351054577
slope_per10  =  -0.0447565586191
slope_per90  =  0.0670675335908
stetson_k  =  0.783731071857
weighted_mean  =  17.7828045535
weighted_std  =  0.276647004407
</pre></body></html>