-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.53


######### Lightcurve features #########

amplitude  =  0.239300494441
cusum  =  0.119915809337
eta  =  0.53218088365
hl_amp_ratio  =  0.470280316438
kurtosis  =  -0.197037503325
n_points  =  326
period  =  0.519812315597
period_SNR  =  40.9157484198
period_log10FAP  =  -41.4459631817
period_uncertainty  =  7.67499891441e-05
phase_cusum  =  0.228184747947
phase_eta  =  0.520925252684
phi21  =  3.9547691916
phi31  =  3.48135790154
quartile31  =  0.35
r21  =  0.254823406611
r31  =  0.159665028838
shapiro_w  =  0.936975359917
skewness  =  -0.723484833509
slope_per10  =  -0.105873167445
slope_per90  =  0.0999607828436
stetson_k  =  0.773613319577
weighted_mean  =  16.7723092955
weighted_std  =  0.222624162533
