-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.265402857061
cusum  =  0.188005373895
eta  =  0.521580957176
hl_amp_ratio  =  0.661633231397
kurtosis  =  -0.528554976913
n_points  =  289
period  =  0.627027425381
period_SNR  =  44.9850583791
period_log10FAP  =  -37.7340611071
period_uncertainty  =  0.000112193573693
phase_cusum  =  0.258710684424
phase_eta  =  0.152564111254
phi21  =  0.954085873229
phi31  =  1.95296090701
quartile31  =  0.29
r21  =  0.496478193963
r31  =  0.293755313842
shapiro_w  =  0.93285036087
skewness  =  -0.654857075662
slope_per10  =  -0.176474170467
slope_per90  =  0.311160283707
stetson_k  =  0.779454211716
weighted_mean  =  13.0327278521
weighted_std  =  0.216757677791
