-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.295847010775
cusum  =  0.125907341265
eta  =  0.631730782722
hl_amp_ratio  =  0.711867082325
kurtosis  =  -0.682423884073
n_points  =  268
period  =  0.608422107894
period_SNR  =  36.7485248847
period_log10FAP  =  -31.3012040271
period_uncertainty  =  0.0001267282096
phase_cusum  =  0.226251823465
phase_eta  =  0.17130826657
phi21  =  3.96404251738
phi31  =  5.0426827621
quartile31  =  0.3675
r21  =  0.479208136859
r31  =  0.312448283526
shapiro_w  =  0.946392595768
skewness  =  -0.525427359513
slope_per10  =  -0.192226854108
slope_per90  =  0.242069625988
stetson_k  =  0.808959706393
weighted_mean  =  13.6634830394
weighted_std  =  0.248156414687
