-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.33


######### Lightcurve features #########

amplitude  =  0.497198563776
cusum  =  0.295882452246
eta  =  0.455117203163
hl_amp_ratio  =  0.163177209504
kurtosis  =  -1.46694809501
n_points  =  65
period  =  0.73296505676
period_SNR  =  10.6852657186
period_log10FAP  =  -7.03890354112
period_uncertainty  =  0.000143471085914
phase_cusum  =  0.354225502597
phase_eta  =  0.324495445966
phi21  =  -2.88595190382
phi31  =  -1.59028281213
quartile31  =  0.85
r21  =  0.257016647525
r31  =  0.170899709814
shapiro_w  =  0.807394623756
skewness  =  -0.508606122858
slope_per10  =  -0.567600019276
slope_per90  =  0.468512019649
stetson_k  =  0.705274340775
weighted_mean  =  14.9652279635
weighted_std  =  0.416874343837
