-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.34


######### Lightcurve features #########

amplitude  =  0.188469222533
cusum  =  0.136978388101
eta  =  0.469385275756
hl_amp_ratio  =  1.18078513217
kurtosis  =  -0.89598209598
n_points  =  360
period  =  0.219763491018
period_SNR  =  39.0499687392
period_log10FAP  =  -41.155786284
period_uncertainty  =  1.31067495926e-05
phase_cusum  =  0.215854520075
phase_eta  =  0.749607948794
phi21  =  2.01508756943
phi31  =  3.45943919029
quartile31  =  0.29
r21  =  0.118837041963
r31  =  0.115946870536
shapiro_w  =  0.978092670441
skewness  =  0.106403418226
slope_per10  =  -0.0291803862122
slope_per90  =  0.0329515697435
stetson_k  =  0.853668429906
weighted_mean  =  11.9422777778
weighted_std  =  0.179653464436
