-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.31


######### Lightcurve features #########

amplitude  =  0.267613672408
cusum  =  0.378398365586
eta  =  0.733714051226
hl_amp_ratio  =  0.481915251885
kurtosis  =  -0.195993891615
n_points  =  24
period  =  0.42923339267
period_SNR  =  4.51054442389
period_log10FAP  =  -0.376907784517
period_uncertainty  =  0.000149819701558
phase_cusum  =  0.378398365586
phase_eta  =  0.690894439249
phi21  =  -1.96700169479
phi31  =  -2.87466768272
quartile31  =  0.105
r21  =  0.166649319824
r31  =  0.0610144058872
shapiro_w  =  0.816654860973
skewness  =  -1.05857031716
slope_per10  =  -0.634199976921
slope_per90  =  0.521278593949
stetson_k  =  0.69320772991
weighted_mean  =  12.4508333333
weighted_std  =  0.142504873211
