-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.280196312179
cusum  =  0.124153990093
eta  =  0.602711957497
hl_amp_ratio  =  0.470357213263
kurtosis  =  -0.812814423097
n_points  =  127
period  =  0.667558230789
period_SNR  =  18.3672517216
period_log10FAP  =  -13.4139735171
period_uncertainty  =  0.000146909828746
phase_cusum  =  0.29357947596
phase_eta  =  0.21463955461
phi21  =  4.48080218195
phi31  =  5.73373923792
quartile31  =  0.425
r21  =  0.433626608359
r31  =  0.227139672977
shapiro_w  =  0.917409896851
skewness  =  -0.613476974946
slope_per10  =  -0.324250004875
slope_per90  =  0.437499990221
stetson_k  =  0.768281608678
weighted_mean  =  14.7836749726
weighted_std  =  0.261410231509
