-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.4


######### Lightcurve features #########

amplitude  =  0.400176809304
cusum  =  0.228771592749
eta  =  0.541135519298
hl_amp_ratio  =  0.39314718055
kurtosis  =  -0.952623509824
n_points  =  65
period  =  0.18138101887
period_SNR  =  9.3129411363
period_log10FAP  =  -5.51171071994
period_uncertainty  =  8.78528621906e-06
phase_cusum  =  0.414465662361
phase_eta  =  0.318363046816
phi21  =  2.41959245181
phi31  =  4.83202028203
quartile31  =  0.57
r21  =  0.22287372264
r31  =  0.128702617064
shapiro_w  =  0.883740484715
skewness  =  -0.663659818843
slope_per10  =  -0.0626145037993
slope_per90  =  0.0484258216668
stetson_k  =  0.748534046584
weighted_mean  =  13.7592487047
weighted_std  =  0.31238461963
