-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.333138641621
cusum  =  0.130110055502
eta  =  0.570825492677
hl_amp_ratio  =  0.402041871938
kurtosis  =  -0.996193934938
n_points  =  230
period  =  0.584025600953
period_SNR  =  33.4876651401
period_log10FAP  =  -27.8231740896
period_uncertainty  =  0.000126476350612
phase_cusum  =  0.332364806771
phase_eta  =  0.174022375734
phi21  =  3.99291094448
phi31  =  5.1553756641
quartile31  =  0.5475
r21  =  0.517686383222
r31  =  0.381302442287
shapiro_w  =  0.894640982151
skewness  =  -0.599973319838
slope_per10  =  -0.235222664322
slope_per90  =  0.295526242014
stetson_k  =  0.789435780163
weighted_mean  =  13.859282758
weighted_std  =  0.328239243718
