<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.42


######### Lightcurve features #########

amplitude  =  0.287585931111
cusum  =  0.244628814273
eta  =  0.576108179968
hl_amp_ratio  =  1.46117047605
kurtosis  =  -1.31197907997
n_points  =  36
period  =  0.782086759461
period_SNR  =  6.04315928279
period_log10FAP  =  -2.22842543866
period_uncertainty  =  0.000170117486735
phase_cusum  =  0.308976715216
phase_eta  =  0.358743100728
phi21  =  -3.09529635953
phi31  =  -3.90433751959
quartile31  =  0.345
r21  =  0.148965331834
r31  =  0.160916513608
shapiro_w  =  0.88997387886
skewness  =  -0.208200008027
slope_per10  =  -1.20348024426
slope_per90  =  0.533734648866
stetson_k  =  0.843061584397
weighted_mean  =  13.6313023256
weighted_std  =  0.198412717016
</pre></body></html>