-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.72


######### Lightcurve features #########

amplitude  =  0.202687271703
cusum  =  0.120437507778
eta  =  0.607267833791
hl_amp_ratio  =  0.853025928256
kurtosis  =  -0.342012744487
n_points  =  340
period  =  0.352062345769
period_SNR  =  39.8228079297
period_log10FAP  =  -38.9616158851
period_uncertainty  =  2.69976111222e-05
phase_cusum  =  0.241055592851
phase_eta  =  0.762745498337
phi21  =  -1.35179086926
phi31  =  -1.26236043821
quartile31  =  0.25
r21  =  0.224429905319
r31  =  0.0581196147865
shapiro_w  =  0.961143791676
skewness  =  -0.535128786096
slope_per10  =  -0.0698738464965
slope_per90  =  0.0675577461411
stetson_k  =  0.805269843854
weighted_mean  =  13.2566929598
weighted_std  =  0.185005403569
