-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.220725501678
cusum  =  0.118508478335
eta  =  0.42523870677
hl_amp_ratio  =  0.861059854998
kurtosis  =  -1.19628626034
n_points  =  367
period  =  0.719404708143
period_SNR  =  49.3376881524
period_log10FAP  =  -55.0802491313
period_uncertainty  =  0.000144019205601
phase_cusum  =  0.306174113892
phase_eta  =  0.0767786598488
phi21  =  -1.92738572565
phi31  =  -3.76957834304
quartile31  =  0.31
r21  =  0.425336973142
r31  =  0.245150845638
shapiro_w  =  0.940933167934
skewness  =  -0.263423171436
slope_per10  =  -0.222174635591
slope_per90  =  0.425798963987
stetson_k  =  0.874750496913
weighted_mean  =  13.5226426289
weighted_std  =  0.185551590121
