-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.0545130768014
cusum  =  0.113321403116
eta  =  1.7775816666
hl_amp_ratio  =  1.25194480212
kurtosis  =  0.409259694364
n_points  =  275
period  =  0.649291678773
period_SNR  =  13.9792178896
period_log10FAP  =  -1.54540327988
period_uncertainty  =  0.000120301582334
phase_cusum  =  0.123218247554
phase_eta  =  1.81130286066
phi21  =  0.609906996437
phi31  =  1.8907820393
quartile31  =  0.15
r21  =  0.537582271432
r31  =  0.0957261793172
shapiro_w  =  0.986610293388
skewness  =  0.368487827482
slope_per10  =  -0.0874777914382
slope_per90  =  0.0711455851078
stetson_k  =  0.765570895045
weighted_mean  =  17.6302009528
weighted_std  =  0.122123109878
