-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.336808929622
cusum  =  0.0878887018572
eta  =  0.774524786853
hl_amp_ratio  =  0.405672395354
kurtosis  =  1.06893828367
n_points  =  216
period  =  0.484404055536
period_SNR  =  31.1733927518
period_log10FAP  =  -23.4606895446
period_uncertainty  =  0.00011424624547
phase_cusum  =  0.250225339589
phase_eta  =  0.345025121066
phi21  =  0.696943359735
phi31  =  -1.69125896093
quartile31  =  0.3025
r21  =  0.438326311102
r31  =  0.198171339074
shapiro_w  =  0.88461959362
skewness  =  -1.2459456757
slope_per10  =  -0.136649999768
slope_per90  =  0.124681530486
stetson_k  =  0.683811219597
weighted_mean  =  13.3102875635
weighted_std  =  0.283322919357
