-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.311978730268
cusum  =  0.132249985034
eta  =  0.60651182083
hl_amp_ratio  =  0.36017497378
kurtosis  =  0.250218981683
n_points  =  132
period  =  0.614249013526
period_SNR  =  14.2940986992
period_log10FAP  =  -9.02813671985
period_uncertainty  =  0.000124362050069
phase_cusum  =  0.347440732327
phase_eta  =  0.33213387006
phi21  =  0.659126645868
phi31  =  1.68940412974
quartile31  =  0.2525
r21  =  0.521305034435
r31  =  0.331699756614
shapiro_w  =  0.867179751396
skewness  =  -1.0804306731
slope_per10  =  -0.318226855032
slope_per90  =  0.438233359406
stetson_k  =  0.662506238573
weighted_mean  =  14.4858240647
weighted_std  =  0.285983682614
