-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.214585755635
cusum  =  0.124832399186
eta  =  0.70680171317
hl_amp_ratio  =  0.358581924607
kurtosis  =  0.202406546934
n_points  =  261
period  =  0.506889381074
period_SNR  =  21.0886120445
period_log10FAP  =  -14.9201523888
period_uncertainty  =  0.000117308354879
phase_cusum  =  0.181825701405
phase_eta  =  0.932603780048
phi21  =  -2.36385381038
phi31  =  -2.78491072241
quartile31  =  0.35
r21  =  0.297667771576
r31  =  0.164051132185
shapiro_w  =  0.896902143955
skewness  =  -1.01645518401
slope_per10  =  -0.0860394732176
slope_per90  =  0.095562257132
stetson_k  =  0.706788786953
weighted_mean  =  12.9976770744
weighted_std  =  0.26935409519
