-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.310251809518
cusum  =  0.110040932728
eta  =  0.525111560338
hl_amp_ratio  =  0.652121884122
kurtosis  =  -0.945888091183
n_points  =  272
period  =  0.593488478971
period_SNR  =  41.5859469712
period_log10FAP  =  -35.2040306627
period_uncertainty  =  0.000121153069058
phase_cusum  =  0.240413587201
phase_eta  =  0.141000362848
phi21  =  1.04224150468
phi31  =  -0.586869538333
quartile31  =  0.37
r21  =  0.459355650775
r31  =  0.234418038676
shapiro_w  =  0.942417919636
skewness  =  -0.407831484982
slope_per10  =  -0.222690274137
slope_per90  =  0.399993825607
stetson_k  =  0.82658986635
weighted_mean  =  12.160675724
weighted_std  =  0.241545659539
