-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.325619374569
cusum  =  0.093279274506
eta  =  0.543481818225
hl_amp_ratio  =  0.680408867202
kurtosis  =  -1.16322234474
n_points  =  374
period  =  0.623837487775
period_SNR  =  46.2159943997
period_log10FAP  =  -52.065271516
period_uncertainty  =  0.000105929074414
phase_cusum  =  0.233576192808
phase_eta  =  0.224789359443
phi21  =  0.898269828079
phi31  =  -1.04577622654
quartile31  =  0.53
r21  =  0.456515789679
r31  =  0.229272037555
shapiro_w  =  0.94501209259
skewness  =  -0.284516655599
slope_per10  =  -0.0761515620142
slope_per90  =  0.0999541570683
stetson_k  =  0.856719721491
weighted_mean  =  12.6031473214
weighted_std  =  0.297935988589
