-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.256741909674
cusum  =  0.22511315438
eta  =  0.680277182382
hl_amp_ratio  =  0.423831098544
kurtosis  =  -1.33816857122
n_points  =  139
period  =  0.607116772092
period_SNR  =  24.4475231856
period_log10FAP  =  -19.0260594199
period_uncertainty  =  0.000109841654214
phase_cusum  =  0.312862566011
phase_eta  =  0.134395313931
phi21  =  1.02080523222
phi31  =  2.145151521
quartile31  =  0.45
r21  =  0.447043535529
r31  =  0.208523237339
shapiro_w  =  0.896190464497
skewness  =  -0.392036838195
slope_per10  =  -0.201274549782
slope_per90  =  0.416549993679
stetson_k  =  0.81110438759
weighted_mean  =  11.2462313112
weighted_std  =  0.233211200284
