-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.69


######### Lightcurve features #########

amplitude  =  0.221716048215
cusum  =  0.191862760275
eta  =  0.453840216293
hl_amp_ratio  =  0.428493431368
kurtosis  =  -1.07052423786
n_points  =  201
period  =  0.834274343551
period_SNR  =  30.6364672094
period_log10FAP  =  -25.8129602037
period_uncertainty  =  0.000241305747854
phase_cusum  =  0.284160608943
phase_eta  =  0.0582637714439
phi21  =  -1.58974123384
phi31  =  -3.21500184751
quartile31  =  0.33
r21  =  0.465364031037
r31  =  0.205701076069
shapiro_w  =  0.893532812595
skewness  =  -0.559156602983
slope_per10  =  -0.303099023213
slope_per90  =  0.585283794355
stetson_k  =  0.796045945436
weighted_mean  =  13.5604235112
weighted_std  =  0.20125964617
