-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.24959613674
cusum  =  0.166186669188
eta  =  0.632356387385
hl_amp_ratio  =  0.486460459336
kurtosis  =  -0.759547872398
n_points  =  207
period  =  0.599609407649
period_SNR  =  29.3379498556
period_log10FAP  =  -24.3768901171
period_uncertainty  =  0.000103860844058
phase_cusum  =  0.276568670995
phase_eta  =  0.349244315078
phi21  =  0.98457280991
phi31  =  2.78598970667
quartile31  =  0.31
r21  =  0.402606861508
r31  =  0.229580061566
shapiro_w  =  0.948449134827
skewness  =  -0.474224319474
slope_per10  =  -0.246121540157
slope_per90  =  0.304206472444
stetson_k  =  0.799971269786
weighted_mean  =  14.1441903224
weighted_std  =  0.202837184007
