-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.235472636741
cusum  =  0.0945535095541
eta  =  0.470482313794
hl_amp_ratio  =  0.523808985943
kurtosis  =  -1.29905123588
n_points  =  342
period  =  0.757889929096
period_SNR  =  45.199706733
period_log10FAP  =  -50.2323448221
period_uncertainty  =  0.000159919387553
phase_cusum  =  0.247263103562
phase_eta  =  0.0445735072839
phi21  =  1.31775751242
phi31  =  2.847710486
quartile31  =  0.35
r21  =  0.477784193839
r31  =  0.291773945637
shapiro_w  =  0.923096239567
skewness  =  -0.223904705084
slope_per10  =  -0.193169090544
slope_per90  =  0.382466570498
stetson_k  =  0.80863847445
weighted_mean  =  14.5234972222
weighted_std  =  0.217661096134
