-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.296158221573
cusum  =  0.117486773797
eta  =  0.631292635571
hl_amp_ratio  =  0.383851487226
kurtosis  =  -0.00953996780034
n_points  =  387
period  =  0.576942329683
period_SNR  =  52.4261262931
period_log10FAP  =  -55.3534292663
period_uncertainty  =  0.000113489414204
phase_cusum  =  0.253614368898
phase_eta  =  0.131320017414
phi21  =  0.901121392736
phi31  =  1.92143133991
quartile31  =  0.28
r21  =  0.459697578653
r31  =  0.18638212441
shapiro_w  =  0.908103048801
skewness  =  -0.930093928117
slope_per10  =  -0.116743938516
slope_per90  =  0.208290169456
stetson_k  =  0.725279418699
weighted_mean  =  14.1331893877
weighted_std  =  0.221529290164
