-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.284675498335
cusum  =  0.211560881706
eta  =  0.619612993682
hl_amp_ratio  =  0.417841644091
kurtosis  =  -1.19058487191
n_points  =  247
period  =  0.533175795746
period_SNR  =  36.7814044835
period_log10FAP  =  -31.3304926655
period_uncertainty  =  0.000114072703394
phase_cusum  =  0.26203882795
phase_eta  =  0.140726707783
phi21  =  0.733024850434
phi31  =  -0.953327260683
quartile31  =  0.44
r21  =  0.456261836166
r31  =  0.352689757825
shapiro_w  =  0.912032604218
skewness  =  -0.408971241231
slope_per10  =  -0.179332956985
slope_per90  =  0.26710007002
stetson_k  =  0.804095322044
weighted_mean  =  14.7149235318
weighted_std  =  0.256795628669
