-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.263396363843
cusum  =  0.128741313028
eta  =  0.583382456579
hl_amp_ratio  =  0.647449713266
kurtosis  =  -0.420753319113
n_points  =  267
period  =  0.647927283105
period_SNR  =  28.5696093557
period_log10FAP  =  -26.8793124305
period_uncertainty  =  0.000112059374215
phase_cusum  =  0.207130003717
phase_eta  =  0.398631245928
phi21  =  -2.25251091513
phi31  =  -4.32164104472
quartile31  =  0.31
r21  =  0.50206967335
r31  =  0.287428681483
shapiro_w  =  0.969461381435
skewness  =  -0.479311326006
slope_per10  =  -0.195924837454
slope_per90  =  0.198133341037
stetson_k  =  0.791215689106
weighted_mean  =  12.4955805243
weighted_std  =  0.229583444792
