-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.316315045007
cusum  =  0.124026194929
eta  =  0.496152976799
hl_amp_ratio  =  0.526079740577
kurtosis  =  -1.02284781181
n_points  =  302
period  =  0.612724604287
period_SNR  =  35.3035364601
period_log10FAP  =  -37.3050130509
period_uncertainty  =  0.000105228519207
phase_cusum  =  0.253430018501
phase_eta  =  0.0816436894932
phi21  =  0.846868455197
phi31  =  2.0528809348
quartile31  =  0.53
r21  =  0.48858337249
r31  =  0.406450952241
shapiro_w  =  0.899076700211
skewness  =  -0.565973792174
slope_per10  =  -0.180569332466
slope_per90  =  0.456279480637
stetson_k  =  0.82963990322
weighted_mean  =  13.4720188053
weighted_std  =  0.303309849314
