-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.204141678871
cusum  =  0.154242006657
eta  =  0.940864351518
hl_amp_ratio  =  0.585342980814
kurtosis  =  -0.58544753824
n_points  =  307
period  =  0.779532711335
period_SNR  =  35.7122653469
period_log10FAP  =  -29.2947698436
period_uncertainty  =  0.000169125389778
phase_cusum  =  0.274084395574
phase_eta  =  0.642014906417
phi21  =  -2.39472662386
phi31  =  -1.70334663067
quartile31  =  0.295
r21  =  0.377220531915
r31  =  0.381986260583
shapiro_w  =  0.955908596516
skewness  =  -0.526215936373
slope_per10  =  -0.103219997138
slope_per90  =  0.0869125023019
stetson_k  =  0.776783406797
weighted_mean  =  17.8253173489
weighted_std  =  0.201519217765
