-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.277277277166
cusum  =  0.0933908568435
eta  =  0.673352667309
hl_amp_ratio  =  0.640809731581
kurtosis  =  -1.25229318063
n_points  =  279
period  =  0.685056531934
period_SNR  =  33.0352613414
period_log10FAP  =  -33.5458634718
period_uncertainty  =  0.000127495078298
phase_cusum  =  0.246224857526
phase_eta  =  0.394323570857
phi21  =  1.09529418041
phi31  =  2.29471495428
quartile31  =  0.46
r21  =  0.470911127626
r31  =  0.232663469137
shapiro_w  =  0.922227561474
skewness  =  -0.318796879341
slope_per10  =  -0.136383601223
slope_per90  =  0.368707027501
stetson_k  =  0.850960864421
weighted_mean  =  13.6906640247
weighted_std  =  0.261888745367
