-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.211304554963
cusum  =  0.138315948605
eta  =  0.578637225354
hl_amp_ratio  =  0.765449619478
kurtosis  =  -0.601410147766
n_points  =  208
period  =  0.605164152699
period_SNR  =  30.0938835674
period_log10FAP  =  -24.5424370543
period_uncertainty  =  0.000171921648165
phase_cusum  =  0.268640176458
phase_eta  =  0.42887327011
phi21  =  -2.03163362593
phi31  =  -1.10445840651
quartile31  =  0.3225
r21  =  0.463374092522
r31  =  0.111173267562
shapiro_w  =  0.964567065239
skewness  =  -0.405832246052
slope_per10  =  -0.166667911852
slope_per90  =  0.303398158043
stetson_k  =  0.815041350442
weighted_mean  =  13.3085479781
weighted_std  =  0.202138045414
