-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.317697672044
cusum  =  0.115186366601
eta  =  0.59888964689
hl_amp_ratio  =  0.427905046642
kurtosis  =  -0.641735824158
n_points  =  513
period  =  0.626966758587
period_SNR  =  64.2572289673
period_log10FAP  =  -65.606202673
period_uncertainty  =  0.000110537161018
phase_cusum  =  0.291541544644
phase_eta  =  0.194454110296
phi21  =  0.968172049548
phi31  =  1.96083179791
quartile31  =  0.46
r21  =  0.444536717466
r31  =  0.392406660336
shapiro_w  =  0.923797905445
skewness  =  -0.6554150246
slope_per10  =  -0.0566195260316
slope_per90  =  0.114841498416
stetson_k  =  0.773603376552
weighted_mean  =  14.7468648286
weighted_std  =  0.29308620672
