-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.205878486447
cusum  =  0.103693631073
eta  =  0.730213832665
hl_amp_ratio  =  0.648864296364
kurtosis  =  -0.789123321217
n_points  =  422
period  =  0.60580695002
period_SNR  =  49.1825007568
period_log10FAP  =  -50.7195744303
period_uncertainty  =  0.00010200831254
phase_cusum  =  0.232240517968
phase_eta  =  0.274831723625
phi21  =  1.11068358374
phi31  =  2.34337145316
quartile31  =  0.28
r21  =  0.48768808774
r31  =  0.336821850034
shapiro_w  =  0.960963189602
skewness  =  -0.388923467286
slope_per10  =  -0.142699998493
slope_per90  =  0.119651756297
stetson_k  =  0.804291596631
weighted_mean  =  16.5615919872
weighted_std  =  0.187430286935
