-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.215059437918
cusum  =  0.149034374573
eta  =  0.554865752741
hl_amp_ratio  =  0.681726747228
kurtosis  =  -0.954509189826
n_points  =  377
period  =  0.688640908255
period_SNR  =  47.2699528277
period_log10FAP  =  -49.8249772235
period_uncertainty  =  0.00013194377156
phase_cusum  =  0.253311295835
phase_eta  =  0.429320566821
phi21  =  -2.36020608485
phi31  =  -1.15886151699
quartile31  =  0.33
r21  =  0.358615419854
r31  =  0.21655709909
shapiro_w  =  0.955325603485
skewness  =  -0.362305477611
slope_per10  =  -0.0837933560769
slope_per90  =  0.119758240714
stetson_k  =  0.83139947335
weighted_mean  =  16.8674266939
weighted_std  =  0.202510481079
