-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.76


######### Lightcurve features #########

amplitude  =  0.490498898843
cusum  =  0.219792084862
eta  =  0.608228652118
hl_amp_ratio  =  0.536093669758
kurtosis  =  -1.3160723854
n_points  =  198
period  =  0.480757325665
period_SNR  =  34.6870700082
period_log10FAP  =  -29.1026916081
period_uncertainty  =  0.000129599719689
phase_cusum  =  0.28315611415
phase_eta  =  0.0990277216692
phi21  =  0.812241059842
phi31  =  1.8041701909
quartile31  =  0.81
r21  =  0.410366424624
r31  =  0.171835794454
shapiro_w  =  0.89785438776
skewness  =  -0.382370930543
slope_per10  =  -0.0677308453542
slope_per90  =  0.276400002961
stetson_k  =  0.840771069002
weighted_mean  =  12.4587997424
weighted_std  =  0.441381956327
