-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.254552139035
cusum  =  0.202007244374
eta  =  0.547596598903
hl_amp_ratio  =  0.737526868567
kurtosis  =  -1.08018232124
n_points  =  160
period  =  0.545528882341
period_SNR  =  24.593257793
period_log10FAP  =  -19.5555939762
period_uncertainty  =  0.000125022995444
phase_cusum  =  0.338107276429
phase_eta  =  0.118423368189
phi21  =  -2.23911261558
phi31  =  -3.99315116389
quartile31  =  0.4025
r21  =  0.522316184971
r31  =  0.325114380905
shapiro_w  =  0.944788396358
skewness  =  -0.318016968834
slope_per10  =  -0.217029999856
slope_per90  =  0.328070006337
stetson_k  =  0.845262503685
weighted_mean  =  14.8322497304
weighted_std  =  0.229980280576
