-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.17897358871
cusum  =  0.121036970734
eta  =  0.568533175395
hl_amp_ratio  =  0.775700821337
kurtosis  =  -1.24306867479
n_points  =  308
period  =  0.622134540296
period_SNR  =  42.9665363631
period_log10FAP  =  -46.1436528838
period_uncertainty  =  0.000105061901738
phase_cusum  =  0.277421830215
phase_eta  =  0.0877625535862
phi21  =  -2.08140935088
phi31  =  -3.84874361439
quartile31  =  0.25
r21  =  0.398527628361
r31  =  0.223737123297
shapiro_w  =  0.935747385025
skewness  =  -0.208040998109
slope_per10  =  -0.265402518021
slope_per90  =  0.461050006561
stetson_k  =  0.869477665988
weighted_mean  =  14.6005348411
weighted_std  =  0.138335180469
